1996 01 - OH4MVH Sheet:

Product: Module no: Pcb no: Designer: Date:

Drw no: o f

C1 4 7 p c e r

C2 4 7 p c e r

C3

10n

X1 3.57MHz

Q1

R34 10k J 3

J 2 J1